〉_{part} N〈 160 180 200 220 240 260 280 300 320 340 360 380 400 chN

6000

8000

10000

12000

14000

16000

18000_{η dηd} ch^{Ndbeam} y

beam

y- ∫^=ch^N

ALICE Total

PHOBOS 200 GeV Au-Au x 2.87

Uncorrelated syst. error

Total syst. error